
CREATE DATABASE `test_db`
    CHARACTER SET 'utf8'
    COLLATE 'utf8_general_ci';

#
# Structure for the `test_table` table : 
#

CREATE TABLE `test_table` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `content` text,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=1 DEFAULT CHARSET=utf8;

